NOT USED
NOT USED
NOT USED
4
26400 BAUD
NOT USED
BEAVIS
FUDDPUCKER
NOT USED
1
100
56
-----------------------------------------------------------------------------
 This is the format of the DORINFO*.DEF file created by Galaxy 5 upon exiting
 to run an Xport, or the LOGON.BAT file (if it exists). Where * is the node
 number the caller is on.
-----------------------------------------------------------------------------
Line 1  - Not Used (all lines reading NOT USED will be blank in the actual
          drop file created).
Line 2  - Not Used.
Line 3  - Not Used.
Line 4  - Com port number.
Line 5  - Callers connected baud rate.
Line 6  - Not Used.
Line 7  - Users first name.
Line 8  - Users last name.
Line 9  - Not Used.
Line 10 - Graphics code. 1=ANSI, 4=RIP, 0=ASCII.
Line 11 - Callers security level.
Line 12 - Callers time left in door.
